<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.7.0">
<drawing>
<library>
<packages>
<package name="PH100MIL2">
<description>2-pin 100mil pinheader</description>
</package>
<package name="PH100MIL3">
<description>3-pin 100mil pinheader</description>
</package>
<package name="PH100MIL4">
<description>4-pin 100mil pinheader</description>
</package>
<package name="PH100MIL6">
<description>6-pin 100mil pinheader</description>
</package>
<package name="JST-PH-6">
<description>JST PC connector 6-pin</description>
</package>
<package name="JST-PH-4">
<description>JST PH connector 4-pin</description>
</package>
<package name="JST-PH-2">
<description>JST PH connector 2-pin</description>
</package>
<package name="TRIM-R">
<description>trim resistor</description>
</package>
<package name="TESTPIN">
<description>testpin</description>
</package>
<package name="ARDSHLD">
<description>pinheaders of arduino shield</description>
</package>
<package name="SLIDESW">
<description>3-pin slide switch (toggle switch)</description>
</package>
<package name="CDS200">
<description>CdS photoresistor</description>
</package>
<package name="BZ">
<description>buzzer</description>
</package>
<package name="LED100MIL">
<description>LED of 100mil width</description>
</package>
<package name="TR300MIL">
<description>transistor of 200mil width</description>
</package>
<package name="PUSHSW">
<description>push switch (tactile switch) / universal footprint</description>
</package>
<package name="R300MIL">
<description>resistor of 300mil width</description>
</package>
<package name="CDS100">
<description>CdS photoresistor</description>
</package>
</packages>
<symbols>
<symbol name="CNCT2">
<description>2-pin connector</description>
<pin name="P1" direction="pas"/>
<pin name="P2" direction="pas"/>
</symbol>
<symbol name="CNCT3">
<description>3-pin connector</description>
<pin name="P0" direction="pas"/>
<pin name="P1" direction="pas"/>
<pin name="P2" direction="pas"/>
</symbol>
<symbol name="CNCT4">
<description>4-pin connector</description>
<pin name="P1" direction="pas"/>
<pin name="P2" direction="pas"/>
<pin name="P3" direction="pas"/>
<pin name="P4" direction="pas"/>
</symbol>
<symbol name="CNCT6">
<description>6-pin connector</description>
<pin name="P1" direction="pas"/>
<pin name="P2" direction="pas"/>
<pin name="P3" direction="pas"/>
<pin name="P4" direction="pas"/>
<pin name="P5" direction="pas"/>
<pin name="P6" direction="pas"/>
</symbol>
<symbol name="VAR-RESISTOR">
<description>variable resistor</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
<pin name="P$3" direction="pas"/>
</symbol>
<symbol name="RESISTOR">
<description>resistor</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
</symbol>
<symbol name="CAPACITOR">
<description>capacitor</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
</symbol>
<symbol name="TESTPIN">
<description>test pin</description>
<pin name="P$1" direction="pas"/>
</symbol>
<symbol name="ARDSHLD">
<description>Arduino shield</description>
<pin name="D0" direction="pas"/>
<pin name="D1" direction="pas"/>
<pin name="D2" direction="pas"/>
<pin name="D3" direction="pas"/>
<pin name="D4" direction="pas"/>
<pin name="D5" direction="pas"/>
<pin name="D6" direction="pas"/>
<pin name="D7" direction="pas"/>
<pin name="D8" direction="pas"/>
<pin name="D9" direction="pas"/>
<pin name="D10" direction="pas"/>
<pin name="D11" direction="pas"/>
<pin name="D12" direction="pas"/>
<pin name="D13" direction="pas"/>
<pin name="A5" direction="pas"/>
<pin name="A4" direction="pas"/>
<pin name="A3" direction="pas"/>
<pin name="A2" direction="pas"/>
<pin name="A1" direction="pas"/>
<pin name="A0" direction="pas"/>
<pin name="VIN" direction="pas"/>
<pin name="GND" direction="pas"/>
<pin name="5V0" direction="pas"/>
<pin name="3V3" direction="pas"/>
<pin name="RESET" direction="pas"/>
<pin name="IOREF" direction="pas"/>
</symbol>
<symbol name="PUSHSW">
<description>push switch (tacile switch)</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
</symbol>
<symbol name="SLIDESW">
<description>slide switch (toggle switch)</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
<pin name="P$3" direction="pas"/>
</symbol>
<symbol name="CDS">
<description>cadmium sulfide photoresistor</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
</symbol>
<symbol name="BUZZER">
<description>buzzer</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
</symbol>
<symbol name="TR-NPN">
<description>NPN transistor</description>
<pin name="C" direction="pas"/>
<pin name="E" direction="pas"/>
<pin name="B" direction="pas"/>
</symbol>
<symbol name="LED">
<description>light emitting diode</description>
<pin name="A" direction="pas"/>
<pin name="K" direction="pas"/>
</symbol>
<symbol name="BULB">
<description>lightbulb</description>
<pin name="P$1" direction="pas"/>
<pin name="P$2" direction="pas"/>
</symbol>
<symbol name="TR-PNP">
<description>PNP transistor</description>
<pin name="C" direction="pas"/>
<pin name="E" direction="pas"/>
<pin name="B" direction="pas"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="CNCT2" prefix="CN">
<gates>
<gate name="G$1" symbol="CNCT2"/>
</gates>
<devices>
<device name="PH100MIL" package="PH100MIL2">
<connects>
<connect gate="G$1" pin="P1" pad="P1"/>
<connect gate="G$1" pin="P2" pad="P2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="JST-PH" package="JST-PH-2">
<connects>
<connect gate="G$1" pin="P1" pad="P1"/>
<connect gate="G$1" pin="P2" pad="P2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="CNCT6" prefix="J">
<gates>
<gate name="G$1" symbol="CNCT6"/>
</gates>
<devices>
<device name="PH100MIL" package="PH100MIL6">
<connects>
<connect gate="G$1" pin="P1" pad="P1"/>
<connect gate="G$1" pin="P2" pad="P2"/>
<connect gate="G$1" pin="P3" pad="P3"/>
<connect gate="G$1" pin="P4" pad="P4"/>
<connect gate="G$1" pin="P5" pad="P5"/>
<connect gate="G$1" pin="P6" pad="P6"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="JST-PH" package="JST-PH-6">
<connects>
<connect gate="G$1" pin="P1" pad="P1"/>
<connect gate="G$1" pin="P2" pad="P2"/>
<connect gate="G$1" pin="P3" pad="P3"/>
<connect gate="G$1" pin="P4" pad="P4"/>
<connect gate="G$1" pin="P5" pad="P5"/>
<connect gate="G$1" pin="P6" pad="P6"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="TRIM-R" prefix="R" uservalue="yes">
<gates>
<gate name="G$1" symbol="VAR-RESISTOR"/>
</gates>
<devices>
<device name="" package="TRIM-R">
<connects>
<connect gate="G$1" pin="P$1" pad="P0"/>
<connect gate="G$1" pin="P$2" pad="P1"/>
<connect gate="G$1" pin="P$3" pad="P2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="TESTPIN" prefix="TP">
<gates>
<gate name="G$1" symbol="TESTPIN"/>
</gates>
<devices>
<device name="PIN" package="TESTPIN">
<connects>
<connect gate="G$1" pin="P$1" pad="P1"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="PH100MIL" package="PH100MIL2">
<connects>
<connect gate="G$1" pin="P$1" pad="P1 P2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="SLIDESW" prefix="SW">
<gates>
<gate name="G$1" symbol="SLIDESW"/>
</gates>
<devices>
<device name="" package="SLIDESW">
<connects>
<connect gate="G$1" pin="P$1" pad="P$1"/>
<connect gate="G$1" pin="P$2" pad="P$2"/>
<connect gate="G$1" pin="P$3" pad="P$3"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="CNCT4" prefix="CN">
<gates>
<gate name="G$1" symbol="CNCT4"/>
</gates>
<devices>
<device name="PH100MIL" package="PH100MIL4">
<connects>
<connect gate="G$1" pin="P1" pad="P1"/>
<connect gate="G$1" pin="P2" pad="P2"/>
<connect gate="G$1" pin="P3" pad="P3"/>
<connect gate="G$1" pin="P4" pad="P4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="JST-PH" package="JST-PH-4">
<connects>
<connect gate="G$1" pin="P1" pad="P1"/>
<connect gate="G$1" pin="P2" pad="P2"/>
<connect gate="G$1" pin="P3" pad="P3"/>
<connect gate="G$1" pin="P4" pad="P4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="CDS" prefix="R">
<gates>
<gate name="G$1" symbol="CDS"/>
</gates>
<devices>
<device name="200MIL" package="CDS200">
<connects>
<connect gate="G$1" pin="P$1" pad="P$1"/>
<connect gate="G$1" pin="P$2" pad="P$2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="PH100MIL" package="PH100MIL2">
<connects>
<connect gate="G$1" pin="P$1" pad="P1"/>
<connect gate="G$1" pin="P$2" pad="P2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="" package="CDS100">
<connects>
<connect gate="G$1" pin="P$1" pad="P$1"/>
<connect gate="G$1" pin="P$2" pad="P$2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="BUZZER" prefix="BZ">
<gates>
<gate name="G$1" symbol="BUZZER"/>
</gates>
<devices>
<device name="200MIL" package="BZ">
<connects>
<connect gate="G$1" pin="P$1" pad="P$1"/>
<connect gate="G$1" pin="P$2" pad="P$2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="PH100MIL" package="PH100MIL2">
<connects>
<connect gate="G$1" pin="P$1" pad="P1"/>
<connect gate="G$1" pin="P$2" pad="P2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="LED" prefix="LD">
<gates>
<gate name="G$1" symbol="LED"/>
</gates>
<devices>
<device name="" package="LED100MIL">
<connects>
<connect gate="G$1" pin="A" pad="A"/>
<connect gate="G$1" pin="K" pad="K"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="CNCT3" prefix="CN">
<gates>
<gate name="G$1" symbol="CNCT3"/>
</gates>
<devices>
<device name="PH100MIL" package="PH100MIL3">
<connects>
<connect gate="G$1" pin="P0" pad="P1"/>
<connect gate="G$1" pin="P1" pad="P2"/>
<connect gate="G$1" pin="P2" pad="P3"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="BULB">
<gates>
<gate name="G$1" symbol="BULB"/>
</gates>
<devices>
<device name="" package="PH100MIL2">
<connects>
<connect gate="G$1" pin="P$1" pad="P1"/>
<connect gate="G$1" pin="P$2" pad="P2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="TR-NPN" prefix="Q">
<gates>
<gate name="G$1" symbol="TR-NPN"/>
</gates>
<devices>
<device name="" package="TR300MIL">
<connects>
<connect gate="G$1" pin="B" pad="P$3"/>
<connect gate="G$1" pin="C" pad="P$2"/>
<connect gate="G$1" pin="E" pad="P$1"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="PUSHSW" prefix="SW">
<gates>
<gate name="G$1" symbol="PUSHSW"/>
</gates>
<devices>
<device name="" package="PUSHSW">
<connects>
<connect gate="G$1" pin="P$1" pad="P$1 P$2 P$3 P$4"/>
<connect gate="G$1" pin="P$2" pad="P$5 P$6 P$7"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="ARDSHLD">
<gates>
<gate name="G$1" symbol="ARDSHLD"/>
</gates>
<devices>
<device name="" package="ARDSHLD">
<connects>
<connect gate="G$1" pin="3V3" pad="3V3"/>
<connect gate="G$1" pin="5V0" pad="5V"/>
<connect gate="G$1" pin="A0" pad="A0"/>
<connect gate="G$1" pin="A1" pad="A1"/>
<connect gate="G$1" pin="A2" pad="A2"/>
<connect gate="G$1" pin="A3" pad="A3"/>
<connect gate="G$1" pin="A4" pad="A4"/>
<connect gate="G$1" pin="A5" pad="A5"/>
<connect gate="G$1" pin="D0" pad="D0"/>
<connect gate="G$1" pin="D1" pad="D1"/>
<connect gate="G$1" pin="D10" pad="D10"/>
<connect gate="G$1" pin="D11" pad="D11"/>
<connect gate="G$1" pin="D12" pad="D12"/>
<connect gate="G$1" pin="D13" pad="D13"/>
<connect gate="G$1" pin="D2" pad="D2"/>
<connect gate="G$1" pin="D3" pad="D3"/>
<connect gate="G$1" pin="D4" pad="D4"/>
<connect gate="G$1" pin="D5" pad="D5"/>
<connect gate="G$1" pin="D6" pad="D6"/>
<connect gate="G$1" pin="D7" pad="D7"/>
<connect gate="G$1" pin="D8" pad="D8"/>
<connect gate="G$1" pin="D9" pad="D9"/>
<connect gate="G$1" pin="GND" pad="GND@1 GND@2"/>
<connect gate="G$1" pin="IOREF" pad="IOREF"/>
<connect gate="G$1" pin="RESET" pad="RESET"/>
<connect gate="G$1" pin="VIN" pad="VIN"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="TR-PNP" prefix="Q">
<gates>
<gate name="G$1" symbol="TR-PNP"/>
</gates>
<devices>
<device name="" package="TR300MIL">
<connects>
<connect gate="G$1" pin="B" pad="P$3"/>
<connect gate="G$1" pin="C" pad="P$2"/>
<connect gate="G$1" pin="E" pad="P$1"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="RESISTOR" prefix="R" uservalue="yes">
<gates>
<gate name="G$1" symbol="RESISTOR"/>
</gates>
<devices>
<device name="" package="R300MIL">
<connects>
<connect gate="G$1" pin="P$1" pad="P$1"/>
<connect gate="G$1" pin="P$2" pad="P$2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
</drawing>
</eagle>
